massachusetts institute of technology Department of Electrical Engineering and Computer Science Cambridge, Massachusetts 02139

Doctoral Thesis Reader Agreement

To:  Department Graduate Committee
From: Prof. Anantha Chandrakasan

The program outlined in the proposal

Title:  Abacus: A Reconfigurable Bit-Parallel SIMD Architecture
Author:  Michael Bolotski
Date:  May 28, 1996
Supervisor:  Dr. Thomas F. Knight, Jr.
Other Reader: Prof. Gill Pratt

is adequate for a Doctoral thesis. I am willing to aid in guiding the research and in evaluating the thesis report as a reader.

Signed: Title: Date:

Comments: