\pagestyle{plain} 
\title{Abacus: A Reconfigurable High-Speeh SIMD Architecture} 
 
\author{Michael Bolotski} 
\prevdegrees{B.A.Sc. Electrical Engineering, University of British Columbia
  (1988)\\
M.A.Sc. Electrical Engineering, University of British Columbia (1990)}

\department{Department of Electrical Engineering and Computer Science} 
\degree{Doctor of Philosophy} 
\degreemonth{September} 
\degreeyear{1996} 
\thesisdate{Sep 6, 1996} 
 
\supervisor{Thomas F. Knight, Jr.}{Principal Research Scientist of
  Electrical Engineering} 
 
\chairman{Frederic R. Morgenthaler}{Chairman, Committee on Graduate Students}  
 
\maketitle 
\cleardoublepage 
 
 
% First copy: start a new page, and save the page number. 
\newpage 
%\pagestyle{empty} 

\setcounter{savepage}{\thepage} 
\begin{abstractpage} 
\input{abstract} 
\end{abstractpage} 
 
%\newpage 
%\mbox{} 
% Second copy: start a new page, and reset the page number.  This way, 
% the second copy of the abstract is not counted as separate pages. 
%\newpage 
%\pagestyle{empty} 
%\setcounter{page}{\thesavepage} 
%\begin{abstractpage} 
%\input{abstract} 
%\end{abstractpage} 
 
\cleardoublepage 
\pagestyle{plain} 
\input{ack} 
